liburnia:Hull StrengthSpeed>

12111098765432DamageFire soldier-1

0Hull Size: smallMass: 2Hull strength: 12max speed: 4(6)max turn: 4soldiers: 2ballista: 0max.turns soldier crew

4321032145pompeius vs. the pirates'2000 Murphys heroes 6