Deceres:Hull StrengthSpeed>

1615141312111098765432DamageFire soldier-1

0Hull Size: largeMass: 6Hull strength: 20max speed: 3(4)max turn: 3soldiers: 8ballista: 3Ballista max.turnsBallista

Ballista soldier crew

201917183210321pompeius vs. the pirates'2000 Murphys heroes 4